0.80.911.11.21.31.4

Ratio0.010.1110100Chl a (mg.m-3)Gordon et al. (1988) - 555/565Gordon et al. (1988) - 510/520Morel (1988) - 555/565Morel (1988) - 510/520Figure 5. Ratios of Rrs510/Rrs520 and Rrs555/Rrs565 predicted from semi-analytical models ofMorel (1988) and Gordon et al. (1988).